From 182dfba3b333c57eccafd7323b47429bdbd77e6d Mon Sep 17 00:00:00 2001
From: daurnimator <quae@daurnimator.com>
Date: Mon, 3 Apr 2017 17:06:55 +1000
Subject: Add docs for x509:getSignatureName

---
 doc/luaossl.tex | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'doc/luaossl.tex')

diff --git a/doc/luaossl.tex b/doc/luaossl.tex
index 49e8e0e..0b1b79b 100644
--- a/doc/luaossl.tex
+++ b/doc/luaossl.tex
@@ -571,6 +571,10 @@ Sets the public key component referenced by the \module{openssl.pkey} object $ke
 
 Returns the digest of the public key as a binary string. $type$ is an optional string describing the digest type, and defaults to ``sha1''.
 
+\subsubsection[\fn{x509:getSignatureName}]{\fn{x509:getSignatureName()}}
+
+Returns the type of signature used to sign the certificate as a string. e.g. ``RSA-SHA1''
+
 \subsubsection[\fn{x509:sign}]{\fn{x509:sign($key$ [, $type$])}}
 
 Signs and updates the instance certificate using the \module{openssl.pkey} $key$. $type$ is an optional string describing the digest type. See \module{pkey:sign}, regarding which types of digests are valid. If $type$ is omitted than a default type is used---``sha1'' for RSA keys, ``dss1'' for DSA keys, and ``ecdsa-with-SHA1'' for EC keys.
-- 
cgit v1.2.3-55-g6feb

