From 464575def4341d65bc3fa72298798755cdee527e Mon Sep 17 00:00:00 2001
From: Rob Mensching <rob@firegiant.com>
Date: Sat, 1 Oct 2022 02:38:00 -0700
Subject: Standardize on .NET 6 as the minimum for .NET Core platform.

Closes 6942
---
 src/ext/Sql/test/WixToolsetTest.Sql/WixToolsetTest.Sql.csproj | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/ext/Sql/test/WixToolsetTest.Sql')

diff --git a/src/ext/Sql/test/WixToolsetTest.Sql/WixToolsetTest.Sql.csproj b/src/ext/Sql/test/WixToolsetTest.Sql/WixToolsetTest.Sql.csproj
index 39949409..de502438 100644
--- a/src/ext/Sql/test/WixToolsetTest.Sql/WixToolsetTest.Sql.csproj
+++ b/src/ext/Sql/test/WixToolsetTest.Sql/WixToolsetTest.Sql.csproj
@@ -3,7 +3,7 @@
 
 <Project Sdk="Microsoft.NET.Sdk">
   <PropertyGroup>
-    <TargetFramework>netcoreapp3.1</TargetFramework>
+    <TargetFramework>net6.0</TargetFramework>
     <IsWixTestProject>true</IsWixTestProject>
   </PropertyGroup>
 
-- 
cgit v1.2.3-55-g6feb

