From bbbe36aed1ac5a1b27314a9f9658f49ef08fbb41 Mon Sep 17 00:00:00 2001
From: Rob Mensching <rob@firegiant.com>
Date: Sat, 30 May 2020 15:22:41 -0700
Subject: Add NCrunch configuration

---
 src/test/WixToolsetTest.Sql/WixToolsetTest.Sql.v3.ncrunchproject | 5 +++++
 1 file changed, 5 insertions(+)
 create mode 100644 src/test/WixToolsetTest.Sql/WixToolsetTest.Sql.v3.ncrunchproject

(limited to 'src/test/WixToolsetTest.Sql')

diff --git a/src/test/WixToolsetTest.Sql/WixToolsetTest.Sql.v3.ncrunchproject b/src/test/WixToolsetTest.Sql/WixToolsetTest.Sql.v3.ncrunchproject
new file mode 100644
index 00000000..7b5b2139
--- /dev/null
+++ b/src/test/WixToolsetTest.Sql/WixToolsetTest.Sql.v3.ncrunchproject
@@ -0,0 +1,5 @@
+﻿<ProjectConfiguration>
+  <Settings>
+    <CopyReferencedAssembliesToWorkspace>True</CopyReferencedAssembliesToWorkspace>
+  </Settings>
+</ProjectConfiguration>
\ No newline at end of file
-- 
cgit v1.2.3-55-g6feb

